 Logging in and out
 ------------------
   You should log in each time you visit ^nodetitle.  This allows the system
to remember, for example, your terminal width and (more importantly)
which messages you have already seen.

   IMPORTANT:  When you get the prompt "Anyroom>" you are considered to be
visiting "Anyroom". When you leave the room, all messages in it will be
marked as having been read -- whether you read them or not. If you do not
visit a given room with new messages this call, the system will remember them
next call.

  To save time you can log in on one line with:
      .Login <YOUR PASSWORD>

  There is a 20-second wait on bad passwords longer than one character, to
discourage password guessing.

 To log out:
      Terminate

 To log out without the Yes/No confirmation:
      .Terminate Quit-also

 To log out without exiting ^nodetitle or breaking the modem connection:
      .Terminate Stay

 This is useful if several people are calling from a single terminal.
 
  To log out without telling the system you've read any messages (as if you
had never been on the system):
       .Terminate Abort


 %COMMANDS Back to the commands help menu.
 %HELPOPT Get a list of all help files in the system.
 %MAINHELP First level of help system.

