                  QEMM Switches and Abbreviations

ADAPTERRAM ARAM
ADAPTERROM AROM
AUTO AU
COMPAQ386S C386SA
COMPAQEGAROM CER
COMPAQHALFROM CHR
COMPAQROMMEMORY CRM
CONTEXTS CO
DISKBUF DB
DISKBUFFRAME DBF
DMA DM
DONTUSEXMS DU
DOS4 D4
EMBMEM EMBB
EXTMEM EXT
FASTINT10 F10
FORCEEMS FEMS
FORCESTEALTHCOPY FSTC
FRAME FR
FRAMEBUF FB
FRAMELENGTH FL
GETSIZE GS
HANDLES HA
HMAMIN
IGNOREA20 IA
INCLUDE I
INCLUDE386 I386
IOTRAP
LABEL LB
LOCKDMA LD
MAPS MA
MEMORY ME MEM
NAMES NA
NOCOMPAQFEATURES NCFE
NOEMS
NOFILL NO
NOHMA
NOROM NR
NOROMHOLES NRH
NOSHADOWRAM NOSH
NOSORT NS
NOTOKENRING NTR
NOTOPMEMORY NT
NOVDS
NOVIDEO NOVID
NOVIDEOFILL NV
NOVIDEORAM NVR
NOWINDOWS3 NW3
NOXBDA NX
NOXMS
OLDDV ODV
OFF OF
ON
RAM
REGION R
ROM
SORT
STEALTHROM STN
SUSPEND SUS
RESUME
SUS
TASKS TA
UNUSUAL8042 U8
UNUSUALEXT UX
VCPISHARE VS
VIDRAMEGA VREGA
VIDRAMEMS VREMS
VIRTUALHDIRQ VHI
VXDDIR
WATCHDOG WD
WINSHRINKUMBS WSU
EXCLUDE X
EXCLUDESTEALTH XST
EXCLUDESTEALTHINT XSTI


NOPAUSEONERROR NOPE  Do not pause on error
PAUSE PAUSE Pause while parsing commands
HELP HELP Display this help text

                                 USAGE

Syntax:
      DEVICE=QEMM386.SYS [switches]
                                  
   QEMM switches:
      ADAPTERRAM=xxxx-yyyy An adapter has RAM in the range
      ADAPTERROM=xxxx-yyyy An adapter has ROM in the range
      AUTO Turn on only if necessary
      COMPAQ386S Identify this as a COMPAQ 386S
      COMPAQEGAROM Relocate COMPAQ's video ROM
      COMPAQHALFROM Split system ROM in half
      COMPAQROMMEMORY Use COMPAQ memory reserved for ROM
      DISKBUF=xx Set the size of the SCSI disk buffer
      DISKBUFFRAME=xx Buffer disk access into the page frame
      DMA=xx Set the size of the DMA buffer
      DONTUSEXMS Do not allow QEMM to get memory from XMS
      DOS4 Alter EMS page ordering for DOS 4.00
      EMBMEM=xxxxx Limit memory available as EMBs to xxxxxK
      EXCLUDE=xxxx-yyyy Consider the range unmappable
      EXCLUDESTEALTH=xxxx Do not Stealth a particular ROM
      EXCLUDESTEALTHINT=xx Do not Stealth a particular interrupt
      EXTMEM=xxxxx Reserve xxxxxK of extended memory
      FASTINT10:n Do not speed up INT 10s with Stealth
      FORCEEMS Still act like EMS even if no frame
      FORCESTEALTHCOPY Copy tables even when eXcluded
      FRAME=xxxx Set the page frame; xxxx=seg or NONE
      FRAMEBUF:y/n Buffer INT 21s into the page frame
      FRAMELENGTH=x Set the page frame to be x pages
      GETSIZE[:f] Report the memory used if loaded high
      HANDLES=xxx Set the number of EMS handles
      HMAMIN=xx Set the minimum size of the HMA (0-63K)
      IGNOREA20 Do not trap the 8042
      INCLUDE=xxxx-yyyy Consider the range mappable
      LOCKDMA Do not allow interrupts during DMA processing
      MAPS=xx Set the number of alternate register sets
      MEMORY=xxxxx Use only xxxxxK of extended memory
      NOCOMPAQFEATURES Disable EGAROM, HALFROM, ROMMEMORY
      NOEMS Do not be an expanded memory manager
      NOFILL Do not fill conventional memory
      NOHMA Do not allow access to the HMA
      NOROM Do not map the "reboot" page of the system ROM
      NOROMHOLES Do not find holes in the system ROM
      NOSHADOWRAM Do not use C&T Shadow RAM
      NOSORT Do not sort memory
      NOTOKENRING Do not look for a token ring adapter
      NOTOPMEMORY Do not look for "top memory"
      NOVDS Disable support for Virtual DMA Services
      NOVIDEOFILL Do not fill into video memory
      NOVIDEORAM Do not put RAM into video memory
      NOWINDOWS3 Do not support Windows 3.0
      NOXBDA Do not move the extended BIOS Data Area
      NOXMS Do not be an extended memory manager
      OLDDV DV 1.3 or 2.00 will be run
      OFF Turn QEMM OFF
      ON Turn QEMM ON
      RAM[=xxxx-yyyy] Put RAM everywhere or in the range
      REGION=x Specify the region to load high into
      ROM[=xxxx[-yyyy]] Map ROM everywhere or in the range
      SORT:Y Sort memory by speed
      STEALTHROM:m/f Reclaim address space of ROMs
      SUSPENDRESUME Support "Suspend/Resume" feature of laptop
      TASKS=xx Set the interrupt nesting level
      UNUSUALEXT The extended memory BIOS is non-standard
      VCPISHARE:Y Share the page table with VCPI clients
      VIDRAMEGA Configure for EGA feature of VIDRAM
      VIDRAMEMS Configure for EMS feature of VIDRAM
      VIRTUALHDIRQ:N Do not suppress INT 15/90 with Stealth
      VXDDIR=path Specify the directory of the .VXD files
      WATCHDOG=[0,1,2] Set the type of Watchdog timer
