;******* Maximus CBCS USERSORT Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.

NAME    Maxusort  WINDOWCOMPAT

DESCRIPTION 'MAXimus CBCS UserSORT. Copyright (1988,90) Rob Hamerling'
; PROTMODE
STACKSIZE  4096
HEAPSIZE   2048
; STUB      "d:\toolkt13\bin\os2stub.exe"
