Setting a stopping point is most important when you are printing, so you don't
get a longer printout than you want. If you are looking at the listings on the
screen, you can always stop at any time using the ESC or Q keys, but it is
handy to have picked a stopping point where the display will stop automatically.

( ) 24 Hours later - if you routinely look at new listings every day it is
ALT-6          useful to be reminded when you have reached a listing 24 hours
               later than the point where you started looking.

( ) Where you last quit - this is the same listing shown as one of the starting
ALT-7          point options. It is likely to be a good choice if you are about
               to print hilited listings for the period you just looked at.

( ) End of fresh listings - If you look at listings later than this, remember
ALT-8         that tomorrow your BBS will give you updated (fresher)
              listings for the day after tomorrow. If you hilite or delete whole
              listings later than the day after tomorrow those marks will be
              lost when the listings are updated. You will NOT lose deletions or
              hilites you make on fields (channel, type, or title.)

( ) Pick a date and time - after you hit the OK button you will be prompted for
ALT-9         a stopping point.

( ) End       - the last listing available
ALT-E                             Hit any key
