There are several likely starting points for you to choose from, to pick the
first listing that will be displayed. The up and down arrows will move the dot,
or you can hold down the ALT key and type the hilited number. When you hit the
OK button whichever option has the dot describes the first listing you will see.

( ) At the Beginning of the listings - the meaning of this is obvious, but the
ALT-0   listing is probably for a program that is already over.

( ) At the Latest listing you have seen - A bookmark is saved whenever you quit
ALT-1                                   | looking at listings so you can easily
( ) At the listing where you last Quit  | start again at the same place; and in
ALT-2   case you move backwards before quitting, another bookmark is set at the
        latest listing you saw (the bottom listing on the latest page you saw.)

( ) What is about to start - this is the default starting point. If you want to
ALT-3   know what is on now, hit Page Up when the listings appear.

( ) You Pick some other date & time - If you don't like any of the other
ALT-4   options, select this. After you hit OK you will be prompted for a
        starting date and time. If there are no listings at that time the first
        listing you see will be just after that time.

( ) Same place you started last time - use this if you want to print listings
ALT-5   in the range you just looked thru.
                                  Hit any key
