If you don't want to hit a key at all and just let the listings scroll by, turn
the Autoscroll feature on. Instructions for how to adjust the speed with which
listings go by will appear when you select that option. Hitting the down arrow
key while Autoscroll is on will temporarily scroll faster. Up works too. The
space bar will stop the scrolling and start it again.

The default display for a new user is not to skip a line between listings. If
you want the screen not to be so crowded, you can put an "X" in the "Skip
between listings" checkbox.

The default display uses the standard print size that puts 25 lines on the
screen. If you add the "X" to the "Use tiny print" checkbox, an EGA display will
switch to 43 line mode, and a VGA display switches to 50 line mode.

A "+" in the column under the cursor indicates there are more details available
which you can see by hitting "?" or "/" or "5". If you select the option to
"Always show Details", whenever a listing with a "+" comes onto the screen at
the bottom the full details will automatically be shown. When you are thru
reading the details, hit a key, and the regular display will reappear in case
you want to hilite or delete. Autoscroll can be used at the same time as
showing all details, but you still must hit a key to signal you are thru
reading the details. Page Up works but Page Down is disabled when you are using
the Always Show Details function.

                                  Hit any key
