
Commands:
:ADD       - Set current mode to link mode.
:LINK      - Set current mode to link mode.
:DELETE    - Set current mode to unlink mode.
:UNLINK    - Set current mode to unlink mode.
:LIST      - Show list of available areas and current links
:AVAILABLE - Show list of available areas and current links
:AVAIL     - Show list of available areas and current links
:HELP      - Show this text.
[Echotag]  - Modify [Echotag] based upon current mode.
+[ECHOTAG] - Link to [Echotag]
-[ECHOTAG] - Unlink from [Echotag]

  Only '+' and '-' take parameters of any type.

  This software accepts requests sent to XIF, AREAFIX, and AREAMGR.

  The default processing mode is link mode.

 *NEW*  '%' may be used in place of ':' in the individual commands above.

  For example: All do the same thing.

  This                       Or                         Or

:ADD                         +Spleen                   Spleen
Spleen                       +XIF-Complaints           XIF-Complaints
XIF-Complaints               -ARJ-Help                 -ARJ-Help
:Unlink                      -Bad                      -Bad
ARJ-Help                     -Spongebath               -Spongebath
Bad
Spongebath