  CTAROT Version 1.2
  Written by James R. Davis
  (C) Copyright 1991 - All Rights Reserved

  This program will require your name to play when in LOCAL mode.
  To call up this program, you need to have a .CFG file present in
  in the current directory.

  Modify the supplied CTAROT.CFG to your needs.  It is commented
  and contains information not supplied here, or use MAKECFG.EXE to
  make it for you.

  To invoke this program in local mode, simply type CTAROT or
  CTAROT LOCAL at the DOS prompt.  Or to get this help type
  CTAROT ? at the DOS prompt.

  To set this program up as a door, modify the supplied CTAROT.CFG
  and use the command CTAROT CTAROT.CFG at the DOS prompt.
  You can change the name of the .CFG file and include drive and
  pathname.
                  


  If an error occurs during program execution a file named CTAROT.ERR
  will be created in the current directory and specify the error with
  a brief description.  Type this file if an error occurs to see what
  you may have to change to fix it.  If the error cannot be fixed, let
  me know exactly what the file contains.  Call the DavisWARE Support BBS
  at (516) 737-4637 to report any problems.

