 Usage Reconfiguration
 -----------------------
   These options control how you use the system and what you see.

    <E>xpert            <F>loors
    <O>ld msg on new    <T>ime
    <M>ail forwarding   <Y>Prompt Edit

 Expert:
 Select using 'E' (.ECE). This controls how many hints and prompts you'll see.

 Floors:
 Select using 'F' (.ECF). This tells the system if you want the additional
structure of
floors added onto the basic structure of rooms.  There's a help file that
already covers this (.Help FLOORS, or find it in the Help System), so please
consult that file for more information.

 Old msg on New Request:
 Select using 'O' (.ECO). This tells the system if you want to see
the last Old message in a given room first when you request <N>ew messages.
This is useful as a "memory jogger" of what was happening in the room last
time you were here.

 Time Display:
 Select using 'T' (.ECT).  Do you want to see the time each message was
generated, or are you content with just the date?

 Mail Forwarding:
 Select using 'M' (.ECM).  You may forward mail sent to this account to another
account on ^nodetitle (to forward your mail to another see the help file
MISCCFG) using this command.
This includes mail received from another system for this account.  The one
exception is mail sent by the Sysop to Citadel, in which case all accounts
will receive the mail and forwarding is not necessary.

 Edit Prompt:
 Select using 'Y' (.ECY).  This controls whether the room name is printed
before the words 'entry cmd: ' (the message entry prompt) as a hint where you
are entering a message.  This prompt will remind you where you are in case
you've accidentally changed rooms when entering a message (this happens
occasionally).

 %RECONFIG Back to reconfiguration.
 %COMMANDS Back to the commands help menu.
 %HELPOPT Get a list of all help files in the system.
 %MAINHELP First level of help system.
