ANSI.SYS must be in C:\DOS, and your CONFIG.SYS must contain
the line DEVICE=C:\DOS\ANSI.SYS or the line DEVICEHIGH=C:\DOS\ANSI.SYS.

Type COLOR and your choice(s) of text color and intensity and
background color (indicated by the B prefix), selected from these
paramaters:

For color displays:

BLACK             BBLACK
RED               BRED
GREEN             BGREEEN
BROWN             BBROWN
YELLOW
BLUE              BBLUE
MAGENTA           BMAGENTA
CYAN              BCYAN
WHITE             BWHITE

For color and monochrome displays:

NORMAL
BRIGHT
REVERSE

For example: >COLOR RED BRIGHT BGREEN
