;******* Maximus CBCS DownSORT Definition File (.DEF) ********
;
;  The module definition file supplies extra information about the program
;  module to the LINKER.

NAME    Downsort  WINDOWCOMPAT

DESCRIPTION 'MAXimus CBCS DOWNload file SORT. Copyright (1987,93) Rob Hamerling'
; PROTMODE
STACKSIZE  12000
HEAPSIZE   8000
