                Country Selection Information                                                                                     The Country Information box in the top-right corner provides     information about the current status of the Country parameter.   The information displayed in the Chronology of History listing isbased in part on the Country parameter.  For example, to view    information on only the United States, the user would select onlythe United States for the Country parameter.                                                                                      The default setting of the country parameter is to include all   countries in the Chronology of History displays.  To modify the  Country Parameter, use the Modify menu and select the Country    Status option.  A submenu will appear prompting for further      information.                                                                                                                      Up to six countries and world regions may be selected (or all    may selected).  If a continent or world region is selected, all  countries of that area will automatically be included.           