                     Year Range Information                                                                                                   The Year Range Information box in the bottom-right corner provides     information about the default year range associated with each time     period.  The information displayed in this box cannot be modified      with the exception of modifying which Time Period is highlighted.      As the effective Time Period is modified by the user, the correspondingline of information will be highlighted.                               