; module-definition file for generic -- used by LINK.EXE
NAME	     Generic	   ; application's module name
DESCRIPTION  'Sample Microsoft Windows Application'
EXETYPE      WINDOWS	   ; required for all Windows applications
STUB	     'WINSTUB.EXE' ; Generates error message if application
			   ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
;DATA must be MULTIPLE if program can be invoked more than once
CODE  PRELOAD MOVEABLE DISCARDABLE
DATA  PRELOAD MOVEABLE MULTIPLE

HEAPSIZE     2048
STACKSIZE    7120	   ; 5120 is recommended minimum

; All functions that will be called by any Windows routine
; MUST be exported.
EXPORTS
	MainWndProc   @1   ; name of window processing function
	About	      @2   ; name of "About" processing function
	Calendar      @3   ; Calendar dialog function
