CHANGE DRIVE & DIRECTORY HELP


 Pressing F10 allows you to change the default drive/dir while using NOAH.
 It uses the external program CDD.EXE to do this....

 You can run CDD from the command line.

 CDD simply displays a point & pick list of drive letters and directories.

 To avoid unexpected results, this version always reads the directory after
 you use CDD.  This will not be present in ZipPak.

