NOTES ON PKZIP(tm) RAM REQUIREMENTS ETC.


   PKZIP seems to need ~156K available RAM to operate properly.  There
   have been no reports of this utility interfering with PKZIP.  This
   software version uses 160K RAM to load, and about 42 bytes per file read
   into memory.  The shell will warn you if it is certain that PKZIP will
   fail to load due to a lack of memory, and if PKZIP does load and runs
   out of RAM, then the files will be remarked with a sigma if you have error
   trapping toggled ON.  Keep error trapping OFF to get the most speed from
   the new features of PKZIP.

   The options containing a -s command parameter for PKZIP in the main
   menu (encrypt to .ZIP and extract w/decrypt) will NOT function properly
   when using a version of PKZIP lower than 1.00.  In fact the package will
   not function at all under .92

   PKZIP is a registered trademark of PKWARE, Inc. 1989 and PKZIP is
   copyrighted material.  To register your copy of PKZIP, contact PKWARE
   through the address and/or BBS given within the documentation of your
   copy.  Please fully support the shareware that you use and enjoy.
