NOAH'S ARK UPGRADES/NEWS

  - 2.8 corrects the klunky change drive/dir command with a new standalone
    external called CDD.EXE. 
  - The seemingly insane quirks in DOS 4.0x are now avoided.
  - Noah's Ark will be replaced with a package call ZipPak/Pro... this new
    utility is being written from the ground up with some ASM professional
    libraries that were not used on Noah's Ark.  It will look/feel something
    like CDD.EXE (new to this package) with 100% mouse support, dialog boxes,
    and much more.  If you wish to beta test it, log on the support BBS.
    No promises on the date of release!!   <grin>
  - Upgrades for Noah's Ark will be replaced by ZipPak.
  - ZipPak will support multiple UNLIMITED upgrades via a command line
    registration scheme.  Users who register this package will receive
    that same level of function. 
  - RAM Checking automatic..
  - Bytes free on disk indicator will flash if bytes free < .5*(Marked Bytes)
     in order to alert you to the possibility that PKZIP will run out of disk
     space.  Use the -b option to redirect the temporary file (see PKZIP)
  - When you invoke a CUSTOM command NOAH displays free RAM so that you may
     rule out an "insufficient memory" error.

